/*
 Navicat Premium Data Transfer

 Source Server         : menduner开发库
 Source Server Type    : MySQL
 Source Server Version : 80020
 Source Host           : 192.168.3.80:3306
 Source Schema         : citu_new

 Target Server Type    : MySQL
 Target Server Version : 80020
 File Encoding         : 65001

 Date: 19/01/2025 21:25:25
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for zeiss_glass_shelf
-- ----------------------------
DROP TABLE IF EXISTS `zeiss_glass_shelf`;
CREATE TABLE `zeiss_glass_shelf`  (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `facetype` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT '' COMMENT '脸型',
  `brand` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '品牌',
  `frametype` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '镜框类型',
  `material` varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '镜框材质',
  `pic_url` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '图片地址',
  `detail_info` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '详情介绍',
  `createor` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '创建者',
  `create_time` timestamp NOT NULL ON UPDATE CURRENT_TIMESTAMP COMMENT '创建时间',
  `updater` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '更新者',
  `update_time` timestamp NULL DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
