<!--  -->
<template>
  <view>
    <view>访问配置业务域名</view>
  </view>
</template>

<script setup>
// import { onMounted } from 'vue'
import { onLoad } from '@dcloudio/uni-app'


// onMounted(() => {
//   console.log('onMounted:', 123)
//   uni.request({
//     url: 'https://minio.menduner.com/dev/34b1e846f19d86cd1a805dc52e121904632c4d80daac64a74be87c1b0778f7da.txt',
//     success: (res) => {
//       debugger
//       console.log('testonMounted:', res?.data)
//     }
//   })
// })

// 页面初始化
onLoad(() => {
  console.log('页面初始化:', 12345)
  uni.request({
    url: 'https://minio.menduner.com/dev/34b1e846f19d86cd1a805dc52e121904632c4d80daac64a74be87c1b0778f7da.txt',
    success: function (res) {
      debugger
      console.log('testonLoad:', res?.data)
    }
  })
})
</script>
<style lang="scss" scoped>
</style>
